51k R39

51k R60

51k R61

51k R62

6.8k

R112 D1N4148 D21 D1N4148 D22

680 R114 51k R115

150k

R116

+ 3

- 2 V+ 8

V- 4

1 TL082

U23A

1k R113

D1N4148 D29 D1N4148 D30

680 R133 51k R134

150k

R135

1k R136

D1N4148 D34 D1N4148 D35

680 R145 51k R146

150k

R147

1k R148

D1N4148 D39 D1N4148 D40

680 R157 51k R158

150k

R159

1k R160

D1N4148 D25

D1N4148 D28

D1N4148 D33

D1N4148 D38

3k R118

LED D23

R124

5.1k

3k R125

LED D27

5.1k

R126

D1N4148 D31 3k R137

LED D32

5.1k

R138

D1N4148 D36 3k R149

LED D37

5.1k

R150 1k R155

1k R143

1k R131

D1N4148 D24 1k R117

D1N4148 D26

220 R128

220 R120

220 R140

220 R152

D1N4148 D41

100k

R161

47k R139

30k R141 33k R142 D45 D1N4148

47k R162

30k R163 33k R164 D1N4148 D46

47k R165

30k R166 33k R167 D1N4148 D47

47k R168

30k R169 33k R170 D1N4148 D48

6.8k

R132

D1N4148 D42

6.8k

R144

D1N4148 D43

6.8k

R156

D1N4148 D44 + 3

- 2 V+ 8

V- 4

1 TL082

U32A

+ 3

- 2 V+ 8

V- 4

1 TL082

U31A

+ 3

- 2 V+ 8

V- 4

1 TL082

U30A

BC550C Q39

R171 3.3k

D1N4148 D49

R172 33k 10n C53

+ 3

- 2 V+ 4

V- 11

1 TL084

U33A

+ 5

- 6 V+ 4

V- 11

7

U34B

TL084

+ 10

- 9 V+ 4

V- 11

8

U35C

TL084

+ 12

- 13 V+ 4

V- 11

14

U36D

TL084

C54 100p

+ 3

- 2 V+ 4

V- 11

1 TL084

U37A

D1N4148 D50

R175 560 R174 33k

Q40 BC560C Q41 BC560C

360k

R177

10n C55 R178 10k

C56 1n

R176 2.2k

+ 5

- 6 V+ 4

V- 11

7 TL084

U38B

D1N4148

D51

D1N4148

D52 + 10

- 9 V+ 4

V- 11

8 TL084

U39C

R180 10meg

D1N4148 D54

R184 10k

D55

D02BZ4_7

+ 12

- 13 V+ 4

V- 11

14 TL084

U40D

D1N4148 D53

100k

R183

R182 100k

R173

100k

0 GND 0

0 0 0

0 -vb

-vb

+vb

0 0 0

0 -vb

0 0 0

0 -vb

0 0 0

0 -vb

TR1 TR2 TR3 TR4

Tr1

Tr2

Tr3

Tr4

GND TR1 TR2 TR3 TR4

0

ON OFF

DRONE

+vb

0

ON OFF

DRONE

+vb

0

ON OFF

DRONE

+vb

0 0

0

ON OFF

DRONE

+vb

POLY MONO

POLY MONO

POLY MONO

POLY

0 GND

GATE1

GATE3 GATE4 GND GATE1

GATE3 GATE4 GND GATE1

GATE3 GATE4

GATE2 GATE2 GATE2

0

0

0 0 0

0 0 0

0 0 0

+vb

-vb

-vb

+vb

-vb

+vb

ORGATE

0 0 0

MONO

SINGLE

MULTI

+vb

-vb

+vb

-vb

+vb

-vb

+vb

-vb

+vb

-vb

0

0

0

+vb

-vb

0

-vb

+vb

-vb

0

0

+vb

0

-vb

MonoCV_0

JH. PolyModular Keyboard Interface Part 3 for polyphonic V/Hz Keyboard Copyright 2000 J. Haible

Retrofit in CS-50

coupled with

NE5532

NE5532

NE5532

NE5532

for CV switching

ZF 5.1 TRIGGER